[{"chomage": "Non", "chomage_desc": null, "project_idea": "Oui", "entre_activity": "Oui", "formation_needs": "Oui", "informal_activity": "Oui", "project_idea_desc": "Mise en place d'un projet en électricité et fils", "entre_activity_desc": "3 ans", "formation_needs_desc": "gestion entrepreneuriale", "informal_activity_desc": "bâtiment et électricité"}]